-- --------------------------------------------------------
-- 主机:                           182.140.223.172
-- Server version:               5.7.30-log - Source distribution
-- Server OS:                    Linux
-- HeidiSQL 版本:                  10.1.0.5464
-- --------------------------------------------------------

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET NAMES utf8 */;
/*!50503 SET NAMES utf8mb4 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;

-- Dumping structure for table ry-config.config_info
CREATE TABLE IF NOT EXISTS `config_info` (
                                             `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
                                             `data_id` varchar(255) COLLATE utf8_bin NOT NULL COMMENT 'data_id',
                                             `group_id` varchar(255) COLLATE utf8_bin DEFAULT NULL,
                                             `content` longtext COLLATE utf8_bin NOT NULL COMMENT 'content',
                                             `md5` varchar(32) COLLATE utf8_bin DEFAULT NULL COMMENT 'md5',
                                             `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                             `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
                                             `src_user` text COLLATE utf8_bin COMMENT 'source user',
                                             `src_ip` varchar(50) COLLATE utf8_bin DEFAULT NULL COMMENT 'source ip',
                                             `app_name` varchar(128) COLLATE utf8_bin DEFAULT NULL,
                                             `tenant_id` varchar(128) COLLATE utf8_bin DEFAULT '' COMMENT '租户字段',
                                             `c_desc` varchar(256) COLLATE utf8_bin DEFAULT NULL,
                                             `c_use` varchar(64) COLLATE utf8_bin DEFAULT NULL,
                                             `effect` varchar(64) COLLATE utf8_bin DEFAULT NULL,
                                             `type` varchar(64) COLLATE utf8_bin DEFAULT NULL,
                                             `c_schema` text COLLATE utf8_bin,
                                             PRIMARY KEY (`id`),
                                             UNIQUE KEY `uk_configinfo_datagrouptenant` (`data_id`,`group_id`,`tenant_id`)
) ENGINE=InnoDB AUTO_INCREMENT=53 DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='config_info';

-- Dumping data for table ry-config.config_info: ~14 rows (approximately)
/*!40000 ALTER TABLE `config_info` DISABLE KEYS */;
INSERT INTO `config_info` (`id`, `data_id`, `group_id`, `content`, `md5`, `gmt_create`, `gmt_modified`, `src_user`, `src_ip`, `app_name`, `tenant_id`, `c_desc`, `c_use`, `effect`, `type`, `c_schema`) VALUES
(1, 'application-dev.yml', 'DEFAULT_GROUP', 'spring:\n  main:\n    allow-bean-definition-overriding: true\n  autoconfigure:\n    exclude: com.alibaba.druid.spring.boot.autoconfigure.DruidDataSourceAutoConfigure\n\n#请求处理的超时时间\nribbon:\n  ReadTimeout: 10000\n  ConnectTimeout: 10000\n\n# feign 配置\nfeign:\n  sentinel:\n    enabled: true\n  okhttp:\n    enabled: true\n  httpclient:\n    enabled: false\n  client:\n    config:\n      default:\n        connectTimeout: 10000\n        readTimeout: 10000\n  compression:\n    request:\n      enabled: true\n    response:\n      enabled: true\n\n# 暴露监控端点\nmanagement:\n  endpoints:\n    web:\n      exposure:\n        include: \'*\'\n', 'c07e6f7321493f6d5390d0a08bffb75a', '2019-11-29 16:31:20', '2020-12-21 15:29:24', NULL, '0:0:0:0:0:0:0:1', '', '', '通用配置', 'null', 'null', 'yaml', 'null'),
(2, 'ruoyi-gateway-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net \n    port: 6379\n    password: [REDACTED]  cloud:\n    gateway:\n      discovery:\n        locator:\n          lowerCaseServiceId: true\n          enabled: true\n      routes:\n        # 认证中心\n        - id: ruoyi-auth\n          uri: lb://ruoyi-auth\n          predicates:\n            - Path=/auth/**\n          filters:\n            # 验证码处理\n            - CacheRequestFilter\n            - ValidateCodeFilter\n            - StripPrefix=1\n        # 代码生成\n        - id: ruoyi-gen\n          uri: lb://ruoyi-gen\n          predicates:\n            - Path=/code/**\n          filters:\n            - StripPrefix=1\n        # 定时任务\n        - id: ruoyi-job\n          uri: lb://ruoyi-job\n          predicates:\n            - Path=/schedule/**\n          filters:\n            - StripPrefix=1\n        # 系统模块\n        - id: ruoyi-system\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/system/**\n          filters:\n            - StripPrefix=1\n        # 文件服务\n        - id: ruoyi-file\n          uri: lb://ruoyi-file\n          predicates:\n            - Path=/file/**\n          filters:\n            - StripPrefix=1\n        # 充电桩服务\n        - id: xhpc-power-pole\n          uri: lb://xhpc-power-pole\n          predicates:\n            - Path=/pp/**\n          filters:\n            - StripPrefix=1\n        # 账号服务\n        - id: xhpc-user\n          uri: lb://xhpc-user\n          predicates:\n            - Path=/xhpc-user/**\n          filters:\n            - StripPrefix=1\n        # 支付服务\n        - id: xhpc-payment\n          uri: lb://xhpc-payment\n          predicates:\n            - Path=/xhpc-payment/**\n          filters:\n            - StripPrefix=1\n        # 订单服务\n        - id: xhpc-order\n          uri: lb://xhpc-order\n          predicates:\n            - Path=/xhpc-order/**\n          filters:\n            - StripPrefix=1\n\n# 不校验白名单\nignore:\n  whites:\n    - /auth/logout\n    - /auth/login\n    - /*/v2/api-docs\n    - /csrf\n    - /xhpc-user/app/user/jscode2session\n    - /xhpc-user/app/user/register\n    - /xhpc-user/app/user/login\n    - /xhpc-user/app/user/loginOut\n    - /xhpc-user/app/user/voluntaryLogin\n    - /xhpc-user/app/user/logout\n    - /xhpc-user/app/user/alipayEmpower\n    - /xhpc-user/app/user/appInfo\n    - /xhpc-payment/wx/paymentCallback', '5a3b5371bf88b6b46ffe8271c7cae24c', '2020-05-14 14:17:55', '2021-07-28 07:50:28', 'nacos', '171.88.42.96', '', '', '网关模块', 'null', 'null', 'yaml', 'null'),
(3, 'ruoyi-auth-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net \n    port: 6379\n    password: [REDACTED] '364ff5f362097c96a2ad12596b5ff9fd', '2020-11-20 00:00:00', '2021-07-23 09:21:25', 'nacos', '0:0:0:0:0:0:0:1', '', '', '认证中心', 'null', 'null', 'yaml', 'null'),
(4, 'ruoyi-monitor-dev.yml', 'DEFAULT_GROUP', '# spring\r\nspring: \r\n  security:\r\n    user:\r\n      name: ruoyi\r\n      password: [REDACTED]  boot:\r\n    admin:\r\n      ui:\r\n        title: 若依服务状态监控\r\n', 'd8997d0707a2fd5d9fc4e8409da38129', '2020-11-20 00:00:00', '2020-12-21 16:28:07', NULL, '0:0:0:0:0:0:0:1', '', '', '监控中心', 'null', 'null', 'yaml', 'null'),
(5, 'ruoyi-system-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring: \n  redis:\n    host: tingsun-znc.f3322.net \n    port: 6379\n    password: [REDACTED]  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          # 主库数据源\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]          # 从库数据源\n          # slave:\n            # username: \n            # password: \n            # url: \n            # driver-class-name: \n      # seata: true    # 开启seata代理，开启后默认每个数据源都代理，如果某个不需要代理可单独关闭\n\n# seata配置\nseata:\n  # 默认关闭，如需启用spring.datasource.dynami.seata需要同时开启\n  enabled: false\n  # Seata 应用编号，默认为 ${spring.application.name}\n  application-id: ${spring.application.name}\n  # Seata 事务组编号，用于 TC 集群名\n  tx-service-group: ${spring.application.name}-group\n  # 关闭自动代理\n  enable-auto-data-source-proxy: false\n  # 服务配置项\n  service:\n    # 虚拟组和分组的映射\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 120.26.46.180:8858\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 120.26.46.180:8858\n      namespace:\n\n# mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.xhpc\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\n    mapperLocations: classpath:mapper/**/*.xml\n\n# swagger配置\nswagger:\n  title: 系统模块接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip', '58d5723fa8c81b12563941261fd7e758', '2020-11-20 00:00:00', '2021-07-28 10:44:08', 'nacos', '0:0:0:0:0:0:0:1', '', '', '系统模块', 'null', 'null', 'yaml', 'null'),
(6, 'ruoyi-gen-dev.yml', 'DEFAULT_GROUP', '# spring配置\r\nspring: \r\n  redis:\r\n    host: tingsun-znc.f3322.net \r\n    port: 6379\r\n    password: [REDACTED]  datasource: \r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n    username: ry-cloud\r\n    password: [REDACTED] mybatis配置\r\nmybatis:\r\n    # 搜索指定包别名\r\n    typeAliasesPackage: com.xhpc.gen.domain\r\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n    mapperLocations: classpath:mapper/**/*.xml\r\n\r\n# swagger配置\r\nswagger:\r\n  title: 代码生成接口文档\r\n  license: Powered By ruoyi\r\n  licenseUrl: https://ruoyi.vip\r\n\r\n# 代码生成\r\ngen: \r\n  # 作者\r\n  author: ruoyi\r\n  # 默认生成包路径 system 需改成自己的模块名称 如 system monitor tool\r\n  packageName: com.xhpc.system\r\n  # 自动去除表前缀，默认是false\r\n  autoRemovePre: false\r\n  # 表前缀（生成类名不会包含表前缀，多个用逗号分隔）\r\n  tablePrefix: sys_\r\n', 'a21c5fa4c7c5731e62453614cf2e7d3f', '2020-11-20 00:00:00', '2021-07-24 14:16:06', NULL, '0:0:0:0:0:0:0:1', '', '', '代码生成', 'null', 'null', 'yaml', 'null'),
(7, 'ruoyi-job-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring: \n  redis:\n    host: tingsun-znc.f3322.net \n    port: 6379\n    password: [REDACTED]  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://182.140.223.172:8036/quartz?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n    username: quartz\n    password: [REDACTED] mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.xhpc.job\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\n    mapperLocations: classpath:mapper/**/*.xml\n\n# swagger配置\nswagger:\n  title: 定时任务接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip\n', 'e9233f5ce3b3de95233ad88bb1a4231a', '2020-11-20 00:00:00', '2021-07-29 08:51:36', 'nacos', '0:0:0:0:0:0:0:1', '', '', '定时任务', 'null', 'null', 'yaml', 'null'),
(8, 'ruoyi-file-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net\n    port: 6379\n    password: [REDACTED] \n  jackson:\n    date-format: yyyy-MM-dd HH:mm:ss\n  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]  enabled: false\n  application-id: ${spring.application.name}\n  tx-service-group: ${spring.application.name}-group\n  enable-auto-data-source-proxy: false\n  service:\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 120.26.46.180:8858\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 120.26.46.180:8858\n      namespace: \n\nmybatis:\n  typeAliasesPackage: com.xhpc.file\n  # 配置mapper的扫描，找到所有的mapper.xml映射文件\n  mapperLocations: classpath:mapper/**/*.xml\n  configuration:\n    call-setters-on-nulls: true\n\n# 本地文件上传    \nfile:\n    domain: http://127.0.0.1:9300\n    path: D:/ruoyi/uploadPath\n    prefix: /statics\n\n# FastDFS配置\nfdfs:\n  domain: http://8.129.231.12\n  soTimeout: 3000\n  connectTimeout: 2000\n  trackerList: 8.129.231.12:22122\n\n# Minio配置\nminio:\n  url: http://8.129.231.12:9000\n  accessKey: minioadmin\n  secretKey: minioadmin\n  bucketName: test\n#oss默认配置\noss:\n  enabled: true\n  name: qiniu\n  tenant-mode: true\n  endpoint: oss-accelerate.aliyuncs.com\n  access-key: LTAIhOKfUxeutGeh\n  secret-key: [REDACTED]\n  bucket-name: dx-gzxh\n', '435441353d3fbaa4ee8165d6f4b0374b', '2020-11-20 00:00:00', '2021-07-29 02:42:04', 'nacos', '171.88.42.96', '', '', '文件服务', 'null', 'null', 'yaml', 'null'),
(9, 'sentinel-ruoyi-gateway', 'DEFAULT_GROUP', '[\r\n    {\r\n        "resource": "ruoyi-auth",\r\n        "count": 500,\r\n        "grade": 1,\r\n        "limitApp": "default",\r\n        "strategy": 0,\r\n        "controlBehavior": 0\r\n    },\r\n	{\r\n        "resource": "ruoyi-system",\r\n        "count": 1000,\r\n        "grade": 1,\r\n        "limitApp": "default",\r\n        "strategy": 0,\r\n        "controlBehavior": 0\r\n    },\r\n	{\r\n        "resource": "ruoyi-gen",\r\n        "count": 200,\r\n        "grade": 1,\r\n        "limitApp": "default",\r\n        "strategy": 0,\r\n        "controlBehavior": 0\r\n    },\r\n	{\r\n        "resource": "ruoyi-job",\r\n        "count": 300,\r\n        "grade": 1,\r\n        "limitApp": "default",\r\n        "strategy": 0,\r\n        "controlBehavior": 0\r\n    }\r\n]', '9f3a3069261598f74220bc47958ec252', '2020-11-20 00:00:00', '2020-11-20 00:00:00', NULL, '0:0:0:0:0:0:0:1', '', '', '限流策略', 'null', 'null', 'json', 'null'),
(20, 'xhpc-power-pile-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net\n    port: 6379\n    password: [REDACTED]  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]  enabled: false\n  application-id: ${spring.application.name}\n  tx-service-group: ${spring.application.name}-group\n  enable-auto-data-source-proxy: false\n  service:\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 120.26.46.180:8858\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 120.26.46.180:8858\n      namespace: \n\nmybatis:\n    typeAliasesPackage: com.xhpc.pp\n    mapperLocations: classpath:mapper/**/*.xml\n', 'e1cad28a4df29955413fa360a40a03dc', '2021-07-19 06:40:44', '2021-07-23 09:05:47', 'nacos', '0:0:0:0:0:0:0:1', '', '', '充电桩协议服务', '', '', 'yaml', ''),
(22, 'xhpc-charging-station-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net\n    port: 6379\n    password: [REDACTED]  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]  enabled: false\n  application-id: ${spring.application.name}\n  tx-service-group: ${spring.application.name}-group\n  enable-auto-data-source-proxy: false\n  service:\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 120.26.46.180:8858\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 120.26.46.180:8858\n      namespace: \n\nmybatis:\n    typeAliasesPackage: com.xhpc\n    mapperLocations: classpath:mapper/**/*.xml\n', '5c9e25c8e8775649c0d5dcb5aed95715', '2021-07-19 08:22:12', '2021-07-28 08:51:17', 'nacos', '0:0:0:0:0:0:0:1', '', '', '', '', '', 'yaml', ''),
(23, 'xhpc-general-dev.yml', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net\n    port: 6379\n    password: [REDACTED]  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]  enabled: false\n  application-id: ${spring.application.name}\n  tx-service-group: ${spring.application.name}-group\n  enable-auto-data-source-proxy: false\n  service:\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 120.26.46.180:8858\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 120.26.46.180:8858\n      namespace: \n\nmybatis:\n    typeAliasesPackage: com.xhpc.general\n    mapperLocations: classpath:mapper/**/*.xml\n', 'c31f612a8d2c67dc69888b7c02bae5d0', '2021-07-20 20:39:06', '2021-07-21 10:03:06', 'nacos', '0:0:0:0:0:0:0:1', '', '', '', '', '', 'yaml', ''),
(24, 'xhpc-user', 'DEFAULT_GROUP', 'spring: \r\n  redis:\r\n    host: tingsun-znc.f3322.net\r\n    port: 6379\r\n    password: [REDACTED] \r\n  jackson:\r\n    date-format: yyyy-MM-dd HH:mm:ss\r\n    time-zone: GMT+8\r\n  datasource:\r\n    druid:\r\n      stat-view-servlet:\r\n        enabled: true\r\n        loginUsername: admin\r\n        loginPassword: [REDACTED]    dynamic:\r\n      druid:\r\n        initial-size: 5\r\n        min-idle: 5\r\n        maxActive: 20\r\n        maxWait: 60000\r\n        timeBetweenEvictionRunsMillis: 60000\r\n        minEvictableIdleTimeMillis: 300000\r\n        validationQuery: SELECT 1 FROM DUAL\r\n        testWhileIdle: true\r\n        testOnBorrow: false\r\n        testOnReturn: false\r\n        poolPreparedStatements: true\r\n        maxPoolPreparedStatementPerConnectionSize: 20\r\n        filters: stat,slf4j\r\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\r\n      datasource:\r\n          master:\r\n            driver-class-name: com.mysql.cj.jdbc.Driver\r\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n            username: ry-cloud\r\n            password: [REDACTED]  enabled: false\r\n  application-id: ${spring.application.name}\r\n  tx-service-group: ${spring.application.name}-group\r\n  enable-auto-data-source-proxy: false\r\n  service:\r\n    vgroup-mapping:\r\n      ruoyi-system-group: default\r\n  config:\r\n    type: nacos\r\n    nacos:\r\n      serverAddr: 120.26.46.180:8858\r\n      group: SEATA_GROUP\r\n      namespace:\r\n  registry:\r\n    type: nacos\r\n    nacos:\r\n      application: seata-server\r\n      server-addr: 120.26.46.180:8858\r\n      namespace: \r\n\r\nmybatis:\r\n  typeAliasesPackage: com.xhpc.user\r\n  # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n  mapperLocations: classpath:mapper/**/*.xml\r\n  configuration:\r\n    call-setters-on-nulls: true\r\n', 'a5bc394601350c323c9ebe171864089b', '2021-07-21 12:11:14', '2021-07-29 16:21:37', NULL, '0:0:0:0:0:0:0:1', '', '', 'null', 'null', 'null', 'yaml', 'null'),
(32, 'xhpc-payment', 'DEFAULT_GROUP', 'spring: \n  redis:\n    host: tingsun-znc.f3322.net\n    port: 6379\n    password: [REDACTED] \n  jackson:\n    date-format: yyyy-MM-dd HH:mm:ss\n  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: ry-cloud\n            password: [REDACTED]  enabled: false\n  application-id: ${spring.application.name}\n  tx-service-group: ${spring.application.name}-group\n  enable-auto-data-source-proxy: false\n  service:\n    vgroup-mapping:\n      ruoyi-system-group: default\n  config:\n    type: nacos\n    nacos:\n      serverAddr: 118.24.137.203:8848\n      group: SEATA_GROUP\n      namespace:\n  registry:\n    type: nacos\n    nacos:\n      application: seata-server\n      server-addr: 118.24.137.203:8848\n      namespace: \n\nmybatis:\n  typeAliasesPackage: com.xhpc.payment\n  # 配置mapper的扫描，找到所有的mapper.xml映射文件\n  mapperLocations: classpath:mapper/**/*.xml\n  configuration:\n    call-setters-on-nulls: true\n', '406756afa55d157cb60305f89f29ec0c', '2021-07-22 16:44:26', '2021-07-22 11:10:56', 'nacos', '110.184.240.136', '', '', '', '', '', 'yaml', ''),
(45, 'xhpc-order', 'DEFAULT_GROUP', 'spring: \r\n  redis:\r\n    host: tingsun-znc.f3322.net\r\n    port: 6379\r\n    password: [REDACTED] \r\n  jackson:\r\n    date-format: yyyy-MM-dd HH:mm:ss\r\n  datasource:\r\n    druid:\r\n      stat-view-servlet:\r\n        enabled: true\r\n        loginUsername: admin\r\n        loginPassword: [REDACTED]    dynamic:\r\n      druid:\r\n        initial-size: 5\r\n        min-idle: 5\r\n        maxActive: 20\r\n        maxWait: 60000\r\n        timeBetweenEvictionRunsMillis: 60000\r\n        minEvictableIdleTimeMillis: 300000\r\n        validationQuery: SELECT 1 FROM DUAL\r\n        testWhileIdle: true\r\n        testOnBorrow: false\r\n        testOnReturn: false\r\n        poolPreparedStatements: true\r\n        maxPoolPreparedStatementPerConnectionSize: 20\r\n        filters: stat,slf4j\r\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\r\n      datasource:\r\n          master:\r\n            driver-class-name: com.mysql.cj.jdbc.Driver\r\n            url: jdbc:mysql://182.140.223.172:8036/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\r\n            username: ry-cloud\r\n            password: [REDACTED]  enabled: false\r\n  application-id: ${spring.application.name}\r\n  tx-service-group: ${spring.application.name}-group\r\n  enable-auto-data-source-proxy: false\r\n  service:\r\n    vgroup-mapping:\r\n      ruoyi-system-group: default\r\n  config:\r\n    type: nacos\r\n    nacos:\r\n      serverAddr: 120.26.46.180:8858\r\n      group: SEATA_GROUP\r\n      namespace:\r\n  registry:\r\n    type: nacos\r\n    nacos:\r\n      application: seata-server\r\n      server-addr: 120.26.46.180:8858\r\n      namespace: \r\n\r\nmybatis:\r\n  typeAliasesPackage: com.xhpc.order\r\n  # 配置mapper的扫描，找到所有的mapper.xml映射文件\r\n  mapperLocations: classpath:mapper/**/*.xml\r\n  configuration:\r\n    call-setters-on-nulls: true\r\n', 'dda0f504b5a217c72b8e9cc62f449da5', '2021-07-26 15:35:37', '2021-07-26 15:35:37', NULL, '0:0:0:0:0:0:0:1', '', '', NULL, NULL, NULL, 'yaml', NULL);
/*!40000 ALTER TABLE `config_info` ENABLE KEYS */;

/*!40101 SET SQL_MODE=IFNULL(@OLD_SQL_MODE, '') */;
/*!40014 SET FOREIGN_KEY_CHECKS=IF(@OLD_FOREIGN_KEY_CHECKS IS NULL, 1, @OLD_FOREIGN_KEY_CHECKS) */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
